 
	YOU MUST ALSO SUPPLY THE ERROR NUMBER, IE
		HELP FCS ERROR 3
  
 
3	-1
	#1
3	1
	.BAD	BAD PARAMETERS
3	-2
	#2
3	2
	.IFC	INVALID FUNCTION CODE
3	-3
	#3
3	3
	.DNR	DEVICE NOT READY
3	-4
	#4
3	4
	.VER	PARITY ERROR ON DEVICE
3	-5
	#5
3	5
	.ONP	HARDWARD OPTION NOT PRESENT
3	-6
	#6
3	6
	.SPC	ILLEGAL USER BUFFER
3	-7
	#7
3	7
	.DNA	DEVICE NOT ATTACHED
3	-8
	#8
3	8
	DAA	DEVICE ALREADY ATTACHED
3	-9
	#9
3	9
	.DUN	DEVICE NOT ATTACHABLE
3	-10
	#10
3	10
	.EOF	END OF FILE DETECTED
3	-11
	#11
3	11
	.EOV	END OF VOLUME DETECTED
3	-12
	#12
3	12
	.WLK	WRITE ATTEMPTED TO LOCKED UNIT
3	-13
	#13
3	13
	.DAO	DATA OVERRUN
3	-14
	#14
3	14
	.SRE	SEND/RECEIVE FAILURE
3	-15
	#15
3	15
	.ABO	REQUEST TERMINATED
3	-16
	#16
3	16
	.PRI	PRIVLEGE VIOLATION
3	-17
	#17
3	17
	.RSU	SHAREABLE RESOURCE IN USE
3	-18
	#18
3	18
	.OVR	ILLEGAL OVERLAY REQUEST
3	-19
	#19
3	19
	.BYT	ODD BYTE COUNT(OR VIRTUAL ADDRESS)
3	-20
	#20
3	20
	.BLK	LOGICAL BLOCK NUMBER TOO LARGE
3	-21
	#21
3	21
	.MOD	INVALID UDC MODULE NUMBER
3	-22
	#22
3	22
	.CON	UDC CONNECT ERROR
3	-23
	#23
3	23
	.NOD	CALLER'S NODES EXHAUSTED
3	-24
	#24
3	24
	.DFU	DEVICE FULL
3	-25
	#25
3	25
	.IFU	INDEX FILE FUL
3	-26
	#26
3	26
	.NSF	NO SUCH FILE
3	-27
	#27
3	27
	.LCK	LOCKED FROM READ/WRITE ACCESS
3	-28
	#28
3	28
	.HFU	FILE HEADER FULL
3	-29
	#29
3	29
	.WAC	ACCESSED FOR WRITE
3	-30
	#30
3	30
	.CKS	FILE HEADER CHECKSUM FAILURE
3	-31
	#31
3	31
	.WAT	ATTRIBUTE CONTROL LIST FORMAT ERROR
3	-32
	#32
3	32
	.RER	FILE PROCESSOR DEVICE READ ERROR
3	-33
	#33
3	33
	.WER	FILE PROCESSOR DEVICE WRITE ERROR
3	-34
	#34
3	34
	.ALN	FILE ALREADY ACCESSED ON LUN
3	-35
	#35
3	35
	.SNC	FILE ID, FILE NUMBER CHECK
3	-36
	#36
3	36
	.SQC	FILE ID SEQUENCE NUMBER CHECK
3	-37
	#37
3	37
	.NLN	NO FLE ACCESSED ON LUN
3	-38
	#38
3	38
	.CLO	FILE NOT PROPERLY CLOSED
3	-39
	#39
3	39
	.NBF	NO BUFFER SPACE AVAILABLE FOR FILE
3	-40
	#40
3	40
	.RBG	ILLEGAL RECORD SIZE
3	-41
	#41
3	41
	.NBK	FILE EXCEEDS SPACE ALLOCATED, NO BLOCKS
3	-42
	#42
3	42
	.ILL	ILLEGAL OPERATION ON FILE DESCRIPTOR BLOCK
3	-43
	#43
3	43
	.BTP	BAD RECORD TYPE
3	-44
	#44
3	44
	.RAC	ILLEGAL RECORD ACCESS BITS EET
3	-45
	#45
3	45
	.RAT	ILLEGAL RECORD ATTRIBUTES BITS SET
3	-46
	#46
3	46
	.RCN	ILLEGAL RECORD NUMBER, TOO LARGE
3	-47
	#47
3	47
	NOT USED
3	-48
	#48
3	48
	.2DV	RENAME - TWO DIFFERENT DEVICES
3	-49
	#49
3	49
	.FEX	RENAME - A NEW FILE NAME ALREADY IN USE
3	-50
	#50
3	50
	.BDR	BAD DIRECTORY FILE
3	-51
	#51
3	51
	.RNM	CANNOT RENAME OLD FILE SYSTEM
3	-52
	#52
3	52
	.BDI	BAD DIRECTORY SYNTAX
3	-53
	#53
3	53
	.FOP	FILE ALREADY OPEN
3	-54
	#54
3	54
	.BNM	BAD FILE NAME
3	-55
	#55
3	55
	.BDV	BAD DEVICE NAME
3	-56
	#56
3	56
	.BBE	BAD BLOCK ON DEVICE
3	-57
	#57
3	57
	.DUP	ENTER - DUPLICATE ENTRY IN DIRECTORY
3	-58
	#58
3	58
	.STK	NOT ENOUGH STACK SPACE(FCS OR FCP)
3	-59
	#59
3	59
	.FHE	FATAL HARDWARE ERROR ON DEVICE
3	-60
	#60
3	60
	.NFI	FILE ID WAS NOT SPECIFIED
3	-61
	#61
3	61
	.ISQ	ILLEGAL SEQUENTIAL OPERATION
3	-62
	#62
3	62
	.EOT	END OF TAPE DETECTED
3	-63
	#63
3	63
	.BVR	BAD VERSION NUMBER
3	-64
	#64
3	64
	.BHD	BAD FILE HEADER
3	-65
	#65
3	65
	.OFL	DEVICE OFF LINE
3	-66
	#66
3	66
	.BCC	BLOCK CHECK, CRC, OR FRAMING ERROR
3	-67
	#67
3	67
		(NOT USED)
3	-68
	#68
3	68
	.NNN	NO SUCH NODE
3	-69
	#69
3	69
	.NFW	PATH LOST TO PARTNER
3	-70
	#70
3	70
	.BLB	BAD LOGICAL BLOCK
3	-71
	#71
3	71
	.TMM	TOO MANY OUTSTANDING MESSAGES
3	-72
	#72
3	72
	.NDR	NO DYNAMIC SPACE AVAILABLE
3	-73
	#73
3	73
	.CNR	CONNECTION REJECTED
3	-74
	#74
3	74
	.TMO	TIMEOUT ON REQUEST
3	-75
	#75
3	75
	.EXP	FILE EXPIRATION DATE NOT REACHED
3	-76
	#76
3	76
	.BTF	BAD TAPE FORMAT
3	-77
	#77
3	77
	.NNC	NOT ANSI "D" FORMAT BYTE COUNT
3	-78
	#78
3	78
	.NNL	NOT NETWORK LUN
3	-79
	#79
3	79
	.NLK	TASK NOT LINKED TO SPECIFIED ICS/ICR INTERRUPTS
3	-80
	#80
3	80
	.NST	SPECIFIED TASK NOT INSTALLED
3	-81
	#81
3	81
	.FLN	DEVICE OFFLINE WHEN OFFLINE REQUEST ISSUED
3	-82
	#82
3	82
	.IES	INVALID ESCAPE SEQUENCE
3	-83
	#83
3	83
	.PES	PARTIAL ESCAPES SEQUENCW
3	-84
	#84
3	84
	.ALC	ALLOCATION FAILURE
3	-85
	#85
3	85
	.ULK	UNLOCK FAILURE
3	-86
	#86
3	86
	.WCK	WRITE CHECK FAILURE
 
 
#
 UNKNOWN QUALIFIER
 
	At present FCS HELP is limited to HELP FCS ERROR NN.
