 
     FORM is a mini-utility which is used to set the form characteristics
 for the DECwriter III LA120 terminal which we use as a line printer.  It
 accepts commands of the form(CCL commands)
 
		FORM type
 
 where (at present) 'type' can have the values 1-8.
 
	TYPE   Horiz. Pitch	Vert. Pitch	Form Length
	1      10.0 char/inch	6 lines/inch	66 lines
	2       5.0 char/inch	4 lines/inch	44 lines
	3       6.0 char/inch	4 lines/inch	44 lines
	4	6.6 char/inch	4 lines/inch	44 lines
	5	8.3 char/inch	6 lines/inch	66 lines
	6      12.0 char/inch	8 lines/inch	88 lines
	7      13.2 char/inch	8 lines/inch	88 lines
	8      16.0 char/inch	8 lines/inch	88 lines

 Each of these forms is designed to use and fill up the standard computer
 printout form leaving about 1/2 inch margins at the top and bottom.

     To change form type, line up the print head with top of
 form(TOF) and type FORM NN from another terminal.
