
 The Run Task command has three general formats, depending on the
 scheduling parameters and whether the task is installed.  The first
 form runs a task either immediately or after a specified delay time
 which may itself be synchronized with a clock unit;  the second runs a
 task at an absolute time-of-day, and the third installs a task, runs it
 immediately, and removes it on exit.  For help on these forms, type:

	HELP RUN DELAYED	For immediate or delayed running.
	HELP RUN ABSOLUTE	For absolute-time requests.
	HELP RUN FILE		For install-run-remove.
2 DELAYED
 The general form of the run-task-after-delay command is:

	RUN taskname <sync> <dtime></RSI=magu></UIC=[uic]>

 Where	taskname is the name of an installed task to be run.
	sync is a single character selected from {H,M,S,T} to synchro-
		nize the delay time with the next hour, minute, second,
		or system clock tick.  If sync is omitted, the delay
		will begin immediately.
	dtime is a delay time parameter consisting of two parts:  an
		integer magnitude, and a single character selected from
		{H,M,S,T} indicating the units.  The delay time value
		must be a 15-bit positive number and must be less than
		or equal to 24 hours, no matter what unit is used.  The
		task initiation request will be made dtime after sync.
		If dtime is omitted, there will be no delay.

 Keywords:

	/RSI=magu	To specify a rescheduling interval.  Format of
			"magu" is the same as the format of "dtime",
			above.  Default is no rescheduling.
	/UIC=[uic]	Specifies the UIC the task will run under.
2 ABSOLUTE
 The general form of the run-task-at-absolute-time-of-day command is:

	RUN taskname atime</RSI=magu></UIC=[uic]>

 Where	taskname is the name of the installed task to be run.
	atime is the absolute time-of-day when this task is to be
		started.  atime is in the format hh:mm:ss.

 Keywords:

	/RSI=magu	Specifies a rescheduling interval for the task.
			The value is in two parts:  an integer magnitude
			and a single character indicating the units the
			interval is specified in, selected from {H,M,S,
			T} for hours, minutes, seconds, and clock ticks.
			The magnitude must be 15 bits or less and may
			not total more than 24 hours.
	/UIC=[uic]	To specify the UIC the task is to run under.
2 FILE
 The general format of the install-run-remove command is:

	RUN <dev:><$>filename</keyword></keyword>...

 Where	dev: is the device-unit on which the task image file resides.
	$ specifies that the file is to be found under the system UIC.
	filename is the name of the file to be run.  If $ is included,
		the filename may not include a UIC specification.

 Keywords:

	/UIC=[uic]	To specify the UIC the task will run under.
	/PRI=priority	To specify the priority (1 to 250) the task will
			run under.  Default is /PRI=50.
	/PAR=parname	To specify the partition the task will run in.
			Default:  the partition specified at task build.
	/TASK=taskname	To specify the taskname to be used for the task.
			Default is TTnn, where nn is the number of the
			requesting terminal.
	/INC=words	Number of words by which the task is to be in-
			creased.  (See the INSTALL command).
